create database if not exists `uav_process`;
USE `uav_process`;
insert  into `act_app_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','flowable','org/flowable/app/db/liquibase/flowable-app-db-changelog.xml','2020-10-14 17:06:26',1,'EXECUTED','8:496fc778bdf2ab13f2e1926d0e63e0a2','createTable tableName=ACT_APP_DEPLOYMENT; createTable tableName=ACT_APP_DEPLOYMENT_RESOURCE; addForeignKeyConstraint baseTableName=ACT_APP_DEPLOYMENT_RESOURCE, constraintName=ACT_FK_APP_RSRC_DPL, referencedTableName=ACT_APP_DEPLOYMENT; createIndex...','',NULL,'3.8.9',NULL,NULL,'2666386460'),('2','flowable','org/flowable/app/db/liquibase/flowable-app-db-changelog.xml','2020-10-14 17:06:26',2,'EXECUTED','8:ccea9ebfb6c1f8367ca4dd473fcbb7db','modifyDataType columnName=DEPLOY_TIME_, tableName=ACT_APP_DEPLOYMENT','',NULL,'3.8.9',NULL,NULL,'2666386460'),('3','flowable','org/flowable/app/db/liquibase/flowable-app-db-changelog.xml','2020-10-14 17:06:26',3,'EXECUTED','8:f1f8aff320aade831944ebad24355f3d','createIndex indexName=ACT_IDX_APP_DEF_UNIQ, tableName=ACT_APP_APPDEF','',NULL,'3.8.9',NULL,NULL,'2666386460');
insert  into `act_app_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
insert  into `act_cmmn_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:22',1,'EXECUTED','8:8b4b922d90b05ff27483abefc9597aa6','createTable tableName=ACT_CMMN_DEPLOYMENT; createTable tableName=ACT_CMMN_DEPLOYMENT_RESOURCE; addForeignKeyConstraint baseTableName=ACT_CMMN_DEPLOYMENT_RESOURCE, constraintName=ACT_FK_CMMN_RSRC_DPL, referencedTableName=ACT_CMMN_DEPLOYMENT; create...','',NULL,'3.8.9',NULL,NULL,'2666381668'),('2','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:22',2,'EXECUTED','8:65e39b3d385706bb261cbeffe7533cbe','addColumn tableName=ACT_CMMN_CASEDEF; addColumn tableName=ACT_CMMN_DEPLOYMENT_RESOURCE; addColumn tableName=ACT_CMMN_RU_CASE_INST; addColumn tableName=ACT_CMMN_RU_PLAN_ITEM_INST','',NULL,'3.8.9',NULL,NULL,'2666381668'),('3','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:23',3,'EXECUTED','8:c01f6e802b49436b4489040da3012359','addColumn tableName=ACT_CMMN_RU_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_RU_CASE_INST; createIndex indexName=ACT_IDX_PLAN_ITEM_STAGE_INST, tableName=ACT_CMMN_RU_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_RU_PLAN_ITEM_INST; addColumn tableNam...','',NULL,'3.8.9',NULL,NULL,'2666381668'),('4','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:23',4,'EXECUTED','8:e40d29cb79345b7fb5afd38a7f0ba8fc','createTable tableName=ACT_CMMN_HI_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_RU_MIL_INST; addColumn tableName=ACT_CMMN_HI_MIL_INST','',NULL,'3.8.9',NULL,NULL,'2666381668'),('5','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:24',5,'EXECUTED','8:70349de472f87368dcdec971a10311a0','modifyDataType columnName=DEPLOY_TIME_, tableName=ACT_CMMN_DEPLOYMENT; modifyDataType columnName=START_TIME_, tableName=ACT_CMMN_RU_CASE_INST; modifyDataType columnName=START_TIME_, tableName=ACT_CMMN_RU_PLAN_ITEM_INST; modifyDataType columnName=T...','',NULL,'3.8.9',NULL,NULL,'2666381668'),('6','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:24',6,'EXECUTED','8:10e82e26a7fee94c32a92099c059c18c','createIndex indexName=ACT_IDX_CASE_DEF_UNIQ, tableName=ACT_CMMN_CASEDEF','',NULL,'3.8.9',NULL,NULL,'2666381668'),('7','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:24',7,'EXECUTED','8:530bc81a1e30618ccf4a2da1f7c6c043','renameColumn newColumnName=CREATE_TIME_, oldColumnName=START_TIME_, tableName=ACT_CMMN_RU_PLAN_ITEM_INST; renameColumn newColumnName=CREATE_TIME_, oldColumnName=CREATED_TIME_, tableName=ACT_CMMN_HI_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_RU_P...','',NULL,'3.8.9',NULL,NULL,'2666381668'),('8','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:24',8,'EXECUTED','8:e8c2eb1ce28bc301efe07e0e29757781','addColumn tableName=ACT_CMMN_HI_PLAN_ITEM_INST','',NULL,'3.8.9',NULL,NULL,'2666381668'),('9','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:25',9,'EXECUTED','8:4cb4782b9bdec5ced2a64c525aa7b3a0','addColumn tableName=ACT_CMMN_RU_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_HI_PLAN_ITEM_INST','',NULL,'3.8.9',NULL,NULL,'2666381668'),('10','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:25',10,'EXECUTED','8:341c16be247f5d17badc9809da8691f9','addColumn tableName=ACT_CMMN_RU_CASE_INST; addColumn tableName=ACT_CMMN_RU_CASE_INST; createIndex indexName=ACT_IDX_CASE_INST_REF_ID_, tableName=ACT_CMMN_RU_CASE_INST; addColumn tableName=ACT_CMMN_HI_CASE_INST; addColumn tableName=ACT_CMMN_HI_CASE...','',NULL,'3.8.9',NULL,NULL,'2666381668'),('11','flowable','org/flowable/cmmn/db/liquibase/flowable-cmmn-db-changelog.xml','2020-10-14 17:06:25',11,'EXECUTED','8:d7c4da9276bcfffbfb0ebfb25e3f7b05','addColumn tableName=ACT_CMMN_RU_PLAN_ITEM_INST; addColumn tableName=ACT_CMMN_HI_PLAN_ITEM_INST','',NULL,'3.8.9',NULL,NULL,'2666381668');
insert  into `act_cmmn_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
insert  into `act_co_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','activiti','org/flowable/content/db/liquibase/flowable-content-db-changelog.xml','2020-10-14 17:06:20',1,'EXECUTED','8:7644d7165cfe799200a2abdd3419e8b6','createTable tableName=ACT_CO_CONTENT_ITEM; createIndex indexName=idx_contitem_taskid, tableName=ACT_CO_CONTENT_ITEM; createIndex indexName=idx_contitem_procid, tableName=ACT_CO_CONTENT_ITEM','',NULL,'3.8.9',NULL,NULL,'2666380282'),('2','flowable','org/flowable/content/db/liquibase/flowable-content-db-changelog.xml','2020-10-14 17:06:20',2,'EXECUTED','8:fe7b11ac7dbbf9c43006b23bbab60bab','addColumn tableName=ACT_CO_CONTENT_ITEM; createIndex indexName=idx_contitem_scope, tableName=ACT_CO_CONTENT_ITEM','',NULL,'3.8.9',NULL,NULL,'2666380282');
insert  into `act_co_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
insert  into `act_dmn_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','activiti','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',1,'EXECUTED','8:c8701f1c71018b55029f450b2e9a10a1','createTable tableName=ACT_DMN_DEPLOYMENT; createTable tableName=ACT_DMN_DEPLOYMENT_RESOURCE; createTable tableName=ACT_DMN_DECISION_TABLE','',NULL,'3.8.9',NULL,NULL,'2666377159'),('2','flowable','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',2,'EXECUTED','8:47f94b27feb7df8a30d4e338c7bd5fb8','createTable tableName=ACT_DMN_HI_DECISION_EXECUTION','',NULL,'3.8.9',NULL,NULL,'2666377159'),('3','flowable','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',3,'EXECUTED','8:ac17eae89fbdccb6e08daf3c7797b579','addColumn tableName=ACT_DMN_HI_DECISION_EXECUTION','',NULL,'3.8.9',NULL,NULL,'2666377159'),('4','flowable','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',4,'EXECUTED','8:f73aabc4529e7292c2942073d1cff6f9','dropColumn columnName=PARENT_DEPLOYMENT_ID_, tableName=ACT_DMN_DECISION_TABLE','',NULL,'3.8.9',NULL,NULL,'2666377159'),('5','flowable','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',5,'EXECUTED','8:3e03528582dd4eeb4eb41f9b9539140d','modifyDataType columnName=DEPLOY_TIME_, tableName=ACT_DMN_DEPLOYMENT; modifyDataType columnName=START_TIME_, tableName=ACT_DMN_HI_DECISION_EXECUTION; modifyDataType columnName=END_TIME_, tableName=ACT_DMN_HI_DECISION_EXECUTION','',NULL,'3.8.9',NULL,NULL,'2666377159'),('6','flowable','org/flowable/dmn/db/liquibase/flowable-dmn-db-changelog.xml','2020-10-14 17:06:17',6,'EXECUTED','8:646c6a061e0b6e8a62e69844ff96abb0','createIndex indexName=ACT_IDX_DEC_TBL_UNIQ, tableName=ACT_DMN_DECISION_TABLE','',NULL,'3.8.9',NULL,NULL,'2666377159');
insert  into `act_dmn_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
insert  into `act_fo_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','activiti','org/flowable/form/db/liquibase/flowable-form-db-changelog.xml','2020-10-14 17:06:18',1,'EXECUTED','8:033ebf9380889aed7c453927ecc3250d','createTable tableName=ACT_FO_FORM_DEPLOYMENT; createTable tableName=ACT_FO_FORM_RESOURCE; createTable tableName=ACT_FO_FORM_DEFINITION; createTable tableName=ACT_FO_FORM_INSTANCE','',NULL,'3.8.9',NULL,NULL,'2666378551'),('2','flowable','org/flowable/form/db/liquibase/flowable-form-db-changelog.xml','2020-10-14 17:06:18',2,'EXECUTED','8:986365ceb40445ce3b27a8e6b40f159b','addColumn tableName=ACT_FO_FORM_INSTANCE','',NULL,'3.8.9',NULL,NULL,'2666378551'),('3','flowable','org/flowable/form/db/liquibase/flowable-form-db-changelog.xml','2020-10-14 17:06:19',3,'EXECUTED','8:abf482518ceb09830ef674e52c06bf15','dropColumn columnName=PARENT_DEPLOYMENT_ID_, tableName=ACT_FO_FORM_DEFINITION','',NULL,'3.8.9',NULL,NULL,'2666378551'),('4','flowable','org/flowable/form/db/liquibase/flowable-form-db-changelog.xml','2020-10-14 17:06:19',4,'EXECUTED','8:2087829f22a4b2298dbf530681c74854','modifyDataType columnName=DEPLOY_TIME_, tableName=ACT_FO_FORM_DEPLOYMENT; modifyDataType columnName=SUBMITTED_DATE_, tableName=ACT_FO_FORM_INSTANCE','',NULL,'3.8.9',NULL,NULL,'2666378551'),('5','flowable','org/flowable/form/db/liquibase/flowable-form-db-changelog.xml','2020-10-14 17:06:19',5,'EXECUTED','8:b4be732b89e5ca028bdd520c6ad4d446','createIndex indexName=ACT_IDX_FORM_DEF_UNIQ, tableName=ACT_FO_FORM_DEFINITION','',NULL,'3.8.9',NULL,NULL,'2666378551');
insert  into `act_fo_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
insert  into `act_ge_property`(`NAME_`,`VALUE_`,`REV_`) values ('batch.schema.version','6.5.0.6',1),('cfg.execution-related-entities-count','true',1),('cfg.task-related-entities-count','true',1),('common.schema.version','6.5.0.6',1),('entitylink.schema.version','6.5.0.6',1),('eventsubscription.schema.version','6.5.0.6',1),('identitylink.schema.version','6.5.0.6',1),('job.schema.version','6.5.0.6',1),('next.dbid','1',1),('schema.history','create(6.5.0.6)',1),('schema.version','6.5.0.6',1),('task.schema.version','6.5.0.6',1),('variable.schema.version','6.5.0.6',1);
insert  into `act_id_property`(`NAME_`,`VALUE_`,`REV_`) values ('schema.version','6.5.0.6',1);
insert  into `flw_ev_databasechangelog`(`ID`,`AUTHOR`,`FILENAME`,`DATEEXECUTED`,`ORDEREXECUTED`,`EXECTYPE`,`MD5SUM`,`DESCRIPTION`,`COMMENTS`,`TAG`,`LIQUIBASE`,`CONTEXTS`,`LABELS`,`DEPLOYMENT_ID`) values ('1','flowable','org/flowable/eventregistry/db/liquibase/flowable-eventregistry-db-changelog.xml','2020-10-14 17:06:15',1,'EXECUTED','8:1b0c48c9cf7945be799d868a2626d687','createTable tableName=FLW_EVENT_DEPLOYMENT; createTable tableName=FLW_EVENT_RESOURCE; createTable tableName=FLW_EVENT_DEFINITION; createIndex indexName=ACT_IDX_EVENT_DEF_UNIQ, tableName=FLW_EVENT_DEFINITION; createTable tableName=FLW_CHANNEL_DEFIN...','',NULL,'3.8.9',NULL,NULL,'2666375603');
insert  into `flw_ev_databasechangeloglock`(`ID`,`LOCKED`,`LOCKGRANTED`,`LOCKEDBY`) values (1,'\0',NULL,NULL);
